’

&

           $

           %

STA 110

Brani Vidakovic Fall 1995 Name:

Quiz 5 (Ver 1)

Cereal. The weights of full boxes of Kellogg’s Nutri-Grain Cereal are normally distributed with a standard deviation œ = 0:18 ounce. If a sample of 12 randomly selected boxes produced a mean weight of 17.28 ounces, find (a) The 95% and 96% confidence intervals for the true weight of a box of this cereal.

(b) Discuss the effect of different confidence levels on the width of the interval in (a).

1