  NFPER  = MECHLOA AVGME FEDRE FRXM FRXA
Response Distribution: Normal
Link Function: Identity

                           Model Equation
NFPER  = 8.5322  - 0.0657 MECHLOA  - 0.0527 AVGME  - 10.166 FEDRE
     + 0.0938 FRXM  + 0.0711 FRXA

             Summary of Fit
Mean of Respo   1.4492
Root MSE   0.2426

                        R-Squar 0.7793
                        Adj R-S 0.7241

                  Analysis of Variance
Source
Model
Error
C Tota

         DF
           5
          20
          25

              Sum of Squar
                   4.1551
                   1.1769
                   5.3320

                           Mean Squa
                              0.8310
                              0.0588

                                       F Stat
                                       14.1227

                                               Prob >
                                               5.6E-06

                             Parameter Estimates
Variable
INTERCEP
MECHLOAD
AVGMEN
FEDREG
FRXML
FRXAM

           DF
             1
             1
             1
             1
             1
             1

                Estimate
                  8.5322
                 -0.0657
                 -0.0527
                -10.1658
                  0.0938
                  0.0711

                         Std Error
                            1.4882
                            0.0114
                            0.0151
                            5.8453
                            0.0626
                            0.0245

                                    T Stat
                                     5.7331
                                    -5.7464
                                    -3.4845
                                    -1.7391
                                     1.4982
                                     2.9005

                                            Prob >|T
                                              0.0001
                                              0.0001
                                              0.0023
                                              0.0974
                                              0.1497
                                              0.0088

                                                     Tolerance
                                                         .
                                                        0.0648
                                                        0.0279
                                                        0.0003
                                                        0.0003
                                                        0.0225

                                                               Var Inflati
                                                                         0
                                                                   15.4381
                                                                   35.7904
                                                                 3774.2736
                                                                 3152.3143
                                                                   44.4823

                                    -1 0 1
                                      RN_NFP_2

                             R_
                             N
                             F
                             P
                             E_
                             2

       1.5 2.0 2.5
          P_NFPE_2

 R_
 N
 F
 P
 E_
 2