  NONFATA  = MECHLOA AVGME FEDRE FRXM FRXA
Response Distribution: Normal
Link Function: Identity

                            Model Equation
NONFATA  = 65.538  - 0.2375 MECHLOA  + 0.0824 AVGME  - 8.5797 FEDRE
     + 0.1170 FRXML  - 0.1121 FRXAM

             Summary of Fit
Mean of Respo  51.3154
Root MSE   2.2271

                        R-Squar 0.9012
                        Adj R-S 0.8765

                  Analysis of Variance
Source
Model
Error
C Tota

         DF
           5
          20
          25

              Sum of Squar
                 905.1728
                  99.2011
                1004.3738

                           Mean Squa
                            181.0346
                              4.9601

                                       F Stat
                                       36.4985

                                               Prob >
                                               2.18E-9

                             Parameter Estimates
Variable
INTERCEP
MECHLOAD
AVGMEN
FEDREG
FRXML
FRXAM

           DF
             1
             1
             1
             1
             1
             1

                Estimate
                 65.5377
                 -0.2375
                  0.0824
                 -8.5797
                  0.1170
                 -0.1121

                         Std Error
                           13.6635
                            0.1050
                            0.1387
                           53.6665
                            0.5748
                            0.2250

                                    T Stat
                                     4.7965
                                    -2.2625
                                     0.5936
                                    -0.1599
                                     0.2036
                                    -0.4979

                                            Prob >|T
                                              0.0001
                                              0.0350
                                              0.5594
                                              0.8746
                                              0.8407
                                              0.6240

                                                     Tolerance
                                                         .
                                                        0.0648
                                                        0.0279
                                                        0.0003
                                                        0.0003
                                                        0.0225

                                                               Var Inflati
                                                                         0
                                                                   15.4381
                                                                   35.7904
                                                                 3774.2736
                                                                 3152.3143
                                                                   44.4823

                                    -1 0 1
                                      RN_NON_1

                             R_
                             N
                             O
                             N
                             F_
                             1

        50 55 60
          P_NONF_1

 R_
 N
 O
 N
 F_
 1