37

    14

     1
     2
     3
     4
     5
     6
     7
     8
     9
    10
    11
    12
    13
    14
    15
    16
    17
    18
    19
    20
    21
    22
    23
    24
    25
    26
    27
    28
    29
    30
    31
    32
    33
    34
    35
    36
    37

          Int
        H_L85
       0.0520
       0.0393
       0.1167
       0.3718
       0.0917
       0.0671
       0.0284
       0.0807
       0.1078
       0.0422
       0.0387
       0.0781
       0.0288
       0.0781
       0.0629
       0.0781
       0.0279
       0.0781
       0.0781
       0.0329
       0.0781
       0.0781
       0.0781
       0.1055
       0.0307
       0.0304
       0.0372
       0.0670
       0.0278
       0.0354
       0.0388
       0.0290
       0.0353
       0.0288
       0.0288
       0.0325
       0.0309

                      Int
                 D_L85
                  0.00166
                  0.01637
                  0.00293
                        .
                  0.01655
                  0.01478
                  0.00168
                  0.00423
                  0.01630
                  0.66770
                  0.00271
                  0.00565
                0.0008875
                  0.00565
                0.0005621
                  0.00565
                0.0002110
                  0.00565
                  0.00565
                0.0007021
                  0.00565
                  0.00565
                  0.00565
                  0.02146
                  0.00131
                  0.00303
               1.05569E-7
                  0.00307
                0.0002491
               7.47277E-8
                  0.01047
                  0.00385
                0.0006241
                0.0000769
                0.0000769
                0.0001948
                  0.00423

                                 Int
                           BL8_INTE
                             0.00637
                            -0.01194
                             0.03094
                                   .
                             0.06157
                            -0.03936
                            -0.04055
                             0.02725
                            -0.06946
                             3.29003
                            -0.00577
                            -0.10490
                            -0.03061
                            -0.10490
                             0.00672
                            -0.10490
                            -0.01311
                            -0.10490
                            -0.10490
                            -0.00857
                            -0.10490
                            -0.10490
                            -0.10490
                            -0.07859
                             0.04116
                            -0.06181
                           0.0000501
                            -0.01781
                            -0.01302
                           0.0003432
                             0.13400
                            -0.06491
                            -0.03133
                            -0.00535
                            -0.00535
                            -0.01667
                            -0.07454

                                            Int
                                       BL8_L84
                                       -0.03880
                                       -0.09774
                                       -0.06591
                                              .
                                       -0.15035
                                        0.13046
                                        0.00845
                                       -0.07351
                                        0.15386
                                       -2.01839
                                       -0.03858
                                        0.08421
                                        0.00783
                                        0.08421
                                       -0.02469
                                        0.08421
                                        0.00133
                                        0.08421
                                        0.08421
                                       -0.01455
                                        0.08421
                                        0.08421
                                        0.08421
                                        0.17613
                                       -0.01559
                                        0.02238
                                      0.0002281
                                        0.05913
                                     -0.0001234
                                     -0.0001771
                                       -0.07667
                                        0.01771
                                        0.01607
                                       -0.00225
                                       -0.00225
                                        0.00741
                                        0.02879

                                                        Int
                                                   RT_L85
                                                   -0.24280
                                                   -0.89153
                                                   -0.20772
                                                          .
                                                   -0.56696
                                                    0.63520
                                                   -0.33489
                                                   -0.30647
                                                    0.51362
                                                   16.44239
                                                   -0.36244
                                                   -0.36036
                                                   -0.24125
                                                   -0.36036
                                                   -0.12755
                                                   -0.36036
                                                   -0.11950
                                                   -0.36036
                                                   -0.36036
                                                   -0.20034
                                                   -0.36036
                                                   -0.36036
                                                   -0.36036
                                                    0.59755
                                                    0.28371
                                                   -0.43438
                                                    0.00230
                                                    0.28824
                                                   -0.13013
                                                    0.00199
                                                    0.71472
                                                   -0.50256
                                                   -0.18206
                                                   -0.07100
                                                   -0.07100
                                                   -0.10615
                                                   -0.50942

                                                                Int
                                                            RS_L85
                                                            -0.2462
                                                            -0.8942
                                                            -0.2107
                                                              .
                                                            -0.5727
                                                             0.6408
                                                            -0.3394
                                                            -0.3106
                                                             0.5193
                                                             5.5047
                                                            -0.3672
                                                            -0.3651
                                                            -0.2447
                                                            -0.3651
                                                            -0.1294
                                                            -0.3651
                                                            -0.1213
                                                            -0.3651
                                                            -0.3651
                                                            -0.2032
                                                            -0.3651
                                                            -0.3651
                                                            -0.3651
                                                             0.6033
                                                             0.2876
                                                            -0.4397
                                                             0.0023
                                                             0.2922
                                                            -0.1321
                                                             0.0020
                                                             0.7199
                                                            -0.5082
                                                            -0.1847
                                                            -0.0721
                                                            -0.0721
                                                            -0.1077
                                                            -0.5151