37

    14

     1
     2
     3
     4
     5
     6
     7
     8
     9
    10
    11
    12
    13
    14
    15
    16
    17
    18
    19
    20
    21
    22
    23
    24
    25
    26
    27
    28
    29
    30
    31
    32
    33
    34
    35
    36
    37

          Int
        H_L85
       0.0417
       0.0333
       0.0868
       0.2710
       0.0691
       0.0520
       0.0283
       0.0614
       0.0805
       0.0409
       0.0329
       0.0703
       0.0287
       0.0703
       0.0491
       0.0703
       0.0276
       0.0703
       0.0703
       0.0293
       0.0703
       0.0703
       0.0703
       0.0788
       0.0307
       0.0303
       0.0320
       0.0519
       0.0272
       0.0350
       0.0380
       0.0289
       0.0349
       0.0272
       0.0272
       0.0324
       0.0309

                      Int
                 D_L85
                0.0003024
                  0.00458
                  0.00739
                  1.85557
               1.73028E-6
                  0.02446
                0.0009458
                  0.00117
                  0.04235
                  0.45120
                0.0000832
                  0.01370
                0.0005073
                  0.01370
                  0.00189
                  0.01370
                0.0000295
                  0.01370
                  0.01370
               4.23153E-6
                  0.01370
                  0.01370
                  0.01370
                  0.04694
                0.0008809
                  0.00229
                0.0009081
                  0.01148
                0.0000179
                0.0000719
                  0.00542
                  0.00257
                0.0008898
                0.0000579
                0.0000579
                0.0002682
                  0.00330

                                 Int
                           BL8_INTE
                           0.0008402
                            -0.02063
                            -0.03659
                             1.23163
                          -0.0004108
                            -0.02127
                            -0.03308
                            -0.00837
                            -0.08140
                             1.43131
                            -0.00293
                            -0.16403
                            -0.02491
                            -0.16403
                            -0.00396
                            -0.16403
                            -0.00548
                            -0.16403
                            -0.16403
                             0.00108
                            -0.16403
                            -0.16403
                            -0.16403
                            -0.08366
                             0.03532
                            -0.05648
                             0.01098
                            -0.01439
                            -0.00401
                            -0.01087
                             0.09735
                            -0.05681
                            -0.03822
                             0.00589
                             0.00589
                            -0.02022
                            -0.06878

                                            Int
                                       BL8_L84
                                        0.01437
                                       -0.04114
                                        0.09964
                                       -2.13083
                                        0.00143
                                        0.15302
                                        0.00899
                                        0.03570
                                        0.23706
                                       -0.86711
                                       -0.00537
                                        0.12867
                                        0.00767
                                        0.12867
                                        0.04064
                                        0.12867
                                        0.00106
                                        0.12867
                                        0.12867
                                      0.0008052
                                        0.12867
                                        0.12867
                                        0.12867
                                        0.24874
                                       -0.01431
                                        0.02212
                                        0.01655
                                        0.10406
                                      0.0004617
                                        0.00565
                                       -0.05538
                                        0.01825
                                        0.01977
                                      0.0008584
                                      0.0008584
                                        0.00928
                                        0.02828

                                                     Int
                                                 RT_L85
                                                  0.1163
                                                 -0.5101
                                                  0.3896
                                                 -3.6829
                                                  0.0067
                                                  0.9431
                                                 -0.2516
                                                  0.1866
                                                  0.9833
                                                  7.2145
                                                 -0.0689
                                                 -0.5967
                                                 -0.1826
                                                 -0.5967
                                                  0.2670
                                                 -0.5967
                                                 -0.0450
                                                 -0.5967
                                                 -0.5967
                                                  0.0165
                                                 -0.5967
                                                 -0.5967
                                                 -0.5967
                                                  1.0491
                                                  0.2327
                                                 -0.3779
                                                  0.2313
                                                  0.6421
                                                 -0.0353
                                                 -0.0621
                                                  0.5185
                                                 -0.4107
                                                 -0.2188
                                                  0.0634
                                                  0.0634
                                                 -0.1248
                                                 -0.4499

                                                             Int
                                                         RS_L85
                                                          0.1179
                                                         -0.5156
                                                          0.3944
                                                         -3.1593
                                                          0.0068
                                                          0.9446
                                                         -0.2550
                                                          0.1892
                                                          0.9837
                                                          4.6011
                                                         -0.0699
                                                         -0.6023
                                                         -0.1852
                                                         -0.6023
                                                          0.2706
                                                         -0.6023
                                                         -0.0456
                                                         -0.6023
                                                         -0.6023
                                                          0.0167
                                                         -0.6023
                                                         -0.6023
                                                         -0.6023
                                                          1.0476
                                                          0.2359
                                                         -0.3826
                                                          0.2345
                                                          0.6476
                                                         -0.0358
                                                         -0.0630
                                                          0.5240
                                                         -0.4156
                                                         -0.2218
                                                          0.0644
                                                          0.0644
                                                         -0.1266
                                                         -0.4551