37

    14

     1
     2
     3
     4
     5
     6
     7
     8
     9
    10
    11
    12
    13
    14
    15
    16
    17
    18
    19
    20
    21
    22
    23
    24
    25
    26
    27
    28
    29
    30
    31
    32
    33
    34
    35
    36
    37

           Int
       H_PCB85
        0.0277
        0.0279
        0.0270
        0.9977
        0.0272
        0.0275
        0.0280
        0.0274
        0.0271
        0.0280
        0.0279
        0.0281
        0.0280
        0.0281
        0.0276
        0.0281
        0.0280
        0.0281
        0.0281
        0.0279
        0.0281
        0.0281
        0.0281
        0.0271
        0.0280
        0.0280
        0.0279
        0.0275
        0.0280
        0.0280
        0.0280
        0.0280
        0.0280
        0.0280
        0.0280
        0.0280

                       Int
                 D_PCB85
                5.78134E-7
                   0.00180
                   0.07307
                      6607
                   0.00863
                   0.01542
                   0.00354
                   0.00640
                   0.14819
                   0.00254
                   0.00109
                   0.00448
                   0.00356
                   0.00448
                   0.00126
                   0.00448
                   0.00321
                   0.00448
                   0.00448
                   0.00168
                   0.00448
                   0.00448
                   0.00448
                   0.15052
                   0.00346
                   0.00385
                 0.0007196
                   0.00728
                   0.00304
                   0.00393
                   0.00374
                   0.00374
                   0.00400
                   0.00242
                   0.00242
                   0.00383

                                Int
                           BPC_INTE
                            -0.0011
                            -0.0593
                             0.4014
                             9.0305
                             0.1299
                             0.1756
                            -0.0833
                             0.1119
                             0.6354
                             0.0704
                            -0.0460
                            -0.0937
                            -0.0835
                            -0.0937
                             0.0494
                            -0.0937
                            -0.0792
                            -0.0937
                            -0.0937
                            -0.0573
                            -0.0937
                            -0.0937
                            -0.0937
                             0.6432
                            -0.0823
                            -0.0868
                            -0.0374
                             0.1196
                            -0.0771
                            -0.0877
                            -0.0855
                            -0.0856
                            -0.0885
                            -0.0688
                            -0.0688
                            -0.0866

                                           Int
                                     BPC_PCB8
                                     0.0001678
                                       0.01026
                                    -0.0007170
                                    -329.69427
                                      -0.01083
                                      -0.02385
                                       0.01564
                                      -0.01227
                                      -0.02199
                                      -0.01339
                                       0.00800
                                       0.01792
                                       0.01570
                                       0.01792
                                      -0.00706
                                       0.01792
                                       0.01481
                                       0.01792
                                       0.01792
                                       0.01028
                                       0.01792
                                       0.01792
                                       0.01792
                                      -0.02735
                                       0.01554
                                       0.01638
                                       0.00655
                                      -0.01627
                                       0.01436
                                       0.01665
                                       0.01626
                                       0.01611
                                       0.01679
                                       0.01266
                                       0.01266
                                       0.01640

                                                       Int
                                                 RT_PCB85
                                                  -0.00628
                                                  -0.35038
                                                   2.45258
                                                 -16.18452
                                                   0.78104
                                                   1.04499
                                                  -0.49051
                                                   0.66934
                                                   3.85803
                                                   0.41429
                                                  -0.27197
                                                  -0.55179
                                                  -0.49166
                                                  -0.55179
                                                   0.29382
                                                  -0.55179
                                                  -0.46647
                                                  -0.55179
                                                  -0.55179
                                                  -0.33791
                                                  -0.55179
                                                  -0.55179
                                                  -0.55179
                                                   3.89994
                                                  -0.48446
                                                  -0.51109
                                                  -0.22094
                                                   0.71189
                                                  -0.45398
                                                  -0.51656
                                                  -0.50350
                                                  -0.50423
                                                  -0.52112
                                                  -0.40536
                                                  -0.40536
                                                  -0.51017

                                                                Int
                                                           RS_PCB85
                                                            -0.0064
                                                            -0.3549
                                                             2.2937
                                                            -5.5659
                                                             0.7854
                                                             1.0436
                                                            -0.4959
                                                             0.6747
                                                             3.2645
                                                             0.4193
                                                            -0.2756
                                                            -0.5574
                                                            -0.4971
                                                            -0.5574
                                                             0.2977
                                                            -0.5574
                                                            -0.4718
                                                            -0.5574
                                                            -0.5574
                                                            -0.3423
                                                            -0.5574
                                                            -0.5574
                                                            -0.5574
                                                             3.2890
                                                            -0.4898
                                                            -0.5166
                                                            -0.2240
                                                             0.7170
                                                            -0.4592
                                                            -0.5221
                                                            -0.5090
                                                            -0.5097
                                                            -0.5266
                                                            -0.4103
                                                            -0.4103
                                                            -0.5156