                Model Equation
OXY  = 81.750  - 292.65 LX  + 32.415 INDLUN

             Summary of Fit
Mean of Respo  69.3000
Root MSE   3.2480

                        R-Squar 0.9578
                        Adj R-S 0.9457

                  Analysis of Variance
Source
Model
Error
C Tota

         DF
           2
           7
           9

              Sum of Squar
                1674.2542
                  73.8458
                1748.1000

                           Mean Squa
                            837.1271
                             10.5494

                                       F Stat
                                       79.3531

                                               Prob >
                                               1.5E-05

                             Parameter Estimates
Variable
INTERCEP
LXW
INDLUNG

           DF
             1
             1
             1

                Estimate
                 81.7500
                -292.650
                 32.4148

                         Std Error
                            1.6240
                           37.5462
                            7.1358

                                    T Stat
                                    50.3389
                                    -7.7944
                                     4.5425

                                            Prob >|T
                                              0.0001
                                              0.0001
                                              0.0027

                                                     Tolerance
                                                         .
                                                        0.0863
                                                        0.0863

                                                               Var Inflati
                                                                         0
                                                                   11.5844
                                                                   11.5844

         Estimated Cov Matrix

INTERCEP
LXW
INDLUNG

         INTERCEPT
           2.6373
         9.37E-14
          -2.6373

                      LXW
                   9.37E-14
                   1409.719
                   -256.099

                             INDLUNG
                              -2.6373
                             -256.099
                              50.9202

     50 60 70 80
           P_OXY_1

 R_
 O
 X
 Y_
 1

                                   -1 0 1
                                      RN_OXY_1

                             R_
                             O
                             X
                             Y_
                             1