                        Model Equation
OX  = 76.667  + 37.498 INDLUN  + 33.333 WIDT  - 325.98 LX

             Summary of Fit
Mean of Respo  69.3000
Root MSE   3.4423

                        R-Squar 0.9593
                        Adj R-S 0.9390

                  Analysis of Variance
Source
Model
Error
C Tota

         DF
           3
           6
           9

              Sum of Squar
                1677.0042
                  71.0958
                1748.1000

                           Mean Squa
                            559.0014
                             11.8493

                                       F Stat
                                       47.1759

                                               Prob >
                                               1.4E-04

                             Parameter Estimates
Variable
INTERCEP
INDLUNG
WIDTH
LXW

           DF
             1
             1
             1
             1

                Estimate
                 76.6667
                 37.4981
                 33.3333
                -325.984

                         Std Error
                           10.6913
                           12.9821
                           69.1924
                           79.8187

                                    T Stat
                                     7.1709
                                     2.8884
                                     0.4817
                                    -4.0841

                                            Prob >|T
                                              0.0004
                                              0.0278
                                              0.6471
                                              0.0065

                                                     Tolerance
                                                         .
                                                        0.0293
                                                        0.2062
                                                        0.0215

                                                               Var Inflati
                                                                         0
                                                                   34.1359
                                                                    4.8485
                                                                   46.6107

     50 60 70 80
            P_OXY

 R_
 O
 X
 Y

                                   -1 0 1
                                       RN_OXY

                             R_
                             O
                             X
                             Y