   LOGRO LOGPPT LOGSED

          2.5 3.0 3.5 4.0

                  LOGRO

 3.0

 3.5

 4.0

L
O
G
P
P
T

          2.5 3.0 3.5 4.0

                  LOGRO

   2

   3

   4

 L
 O
 G
 S
 E
 D

                                            3.0 3.5 4.0

                                                       LOGPPT

                                         2

                                         3

                                         4

                                       L
                                       O
                                       G
                                       S
                                       E
                                       D

                                                Correlation Matrix

                                        LOGRO

                                        LOGPP

                                        LOGSE

                                                LOGRO

                                                1.0000

                                                0.9738

                                                0.8433

                                                        LOGPPT

                                                         0.9738

                                                         1.0000

                                                         0.8647

                                                                 LOGSED

                                                                 0.8433

                                                                 0.8647

                                                                 1.0000