  LOGSED  = LOGRO LOGPPT
Response Distributi Norma
Link Function: Identity

                    Model Equation
LOGSE  =  - 4.8162  + 0.0388 LOGR  + 2.2308 LOGPP

             Summary of Fit
Mean of Respo   3.2002
Root MSE   0.4505

                        R-Squar 0.7478
                        Adj R-S 0.7163

                  Analysis of Variance
Source
Model
Error
C Tota

         DF
           2
          16
          18

              Sum of Squar
                   9.6271
                   3.2471
                  12.8742

                           Mean Squa
                              4.8136
                              0.2029

                                       F Stat
                                       23.7189

                                               Prob >
                                               1.6E-05

                             Parameter Estimates
Variable
INTERCEP
LOGRO
LOGPPT

           DF
             1
             1
             1

                Estimate
                 -4.8162
                  0.0388
                  2.2308

                         Std Error
                            2.1729
                            0.9420
                            1.4623

                                    T Stat
                                    -2.2165
                                     0.0412
                                     1.5255

                                            Prob >|T
                                              0.0415
                                              0.9676
                                              0.1466

                                                     Tolerance
                                                         .
                                                        0.0517
                                                        0.0517

                                                               Var Inflati
                                                                         0
                                                                   19.3514
                                                                   19.3514

     2 3 4
          P_LOGS_2

 R_
 L
 O
 G
 S_
 2

                                    -1 0 1
                                      RN_LOG_2

                             R_
                             L
                             O
                             G
                             S_
                             2

         Estimated Corr Matrix

INTERCEP
LOGRO
LOGPPT

         INTERCEPT
           1.0000
           0.8399
          -0.9408

                     LOGRO
                     0.8399
                     1.0000
                    -0.9738

                              LOGPPT
                              -0.9408
                              -0.9738
                               1.0000